\documentclass[11pt]{article}
\setlength{\textheight}{8.7 in}
\setlength{\textwidth}{6.5 in}
\setlength{\topmargin}{1 cm}
\setlength{\oddsidemargin}{0.1 in}
\setlength{\evensidemargin}{-0.3 in}
\setlength{\headheight}{0 cm}
\setlength{\headsep}{0 cm}
\setlength{\topskip}{0 cm}
\pagestyle{empty}
\usepackage[pdftex]{graphics}
\begin{document}
\vspace*{-2.1 in}
\hspace*{-.82 in}\scalebox{0.95}{\includegraphics{raysetR.jpg}}\\
\vspace*{-0.5 in}\\
Page 50, Fig. 2.25:  The imaginary part of wave polarization
should be in card columns 74-77, and the implied decimal point
should be between card columns 75 and 76.  Since 2007, we have
$\log_{10}$ of density in $kg/m^3$ in columns 81-90 with an
implied decimal point between columns 85 and 86.
\end{document}
